= nodes | le-fay.dn42

link:../[<< back]

== public nodes

these nodes are currently accepting new peerings.
for information on how to set up a peering, see link:../[the main page].

*note:* new peerings are currently preferred on <<oak>>.
if you'd rather peer with a different node, please explain why in your email.

[#ash]
=== ash.le-fay.org

location::								Cambridge, UK - Mythic Beasts
DNS name (clearnet)::			[.node]#ash.le-fay.org#
IPv6 address (clearnet)::	[.ipaddr]#2a00:1098:6b:400::4#
DNS name (DN42)::					[.node]#ash.le-fay.dn42#
IPv6 address (DN42)::			[.ipaddr]#fd5b:a83:b06b:100::1#
IPv4 address (DN42)::			[.ipaddr]#172.23.76.0#
Wireguard public key::		[.key]#Whll1SCzNLqPcKMdfGpJF1SdAt49lXThSrkHwnP72iw=#
Wireguard port::					20000 + last four digits of your ASN
IPv6 link-local address::	[.ipaddr]#fe80::1495:1#

[#oak]
=== oak.le-fay.org

location::								London, UK - Jump Networks
DNS name (clearnet)::			[.node]#oak.le-fay.org#
IPv6 address (clearnet)::	[.ipaddr]#2001:ba8:4015:100::3#
DNS name (DN42)::					[.node]#oak.le-fay.dn42#
IPv6 address (DN42)::			[.ipaddr]#fd5b:a83:b06b:900::1#
IPv4 address (DN42)::			[.ipaddr]#172.23.76.1#
Wireguard public key::		[.key]#sZ07jrWqPHvuJuDrgJxMoHpdOtX4sXhZYoDVgoymLFI=#
Wireguard port::					20000 + last four digits of your ASN
IPv6 link-local address::	[.ipaddr]#fe80::1495:2#
